ZEUS

0

5

10

15

20

1 10 10^2 10^3 10^4

xS

Q^2(GeV^2)

(b) ZEUS NLO QCD fit tot. error (α_s-free) tot. error (α_s-fixed) x=0.0001

x=0.001

x=0.01

x=0.1